\ DBGFIX.HLP    make INLINE NEXT kernel debugable.      by Tom Zimmer

DEBUGABLE       ( --- )

          This handy little utility allows me to build the F-PC kernel
        with INLINE NEXT, for performance, and at will convert the
        kernel back to JMP NEXT for use when DEBUGging. It is a one way
        street however so once the conversion is made, the system stays
        debugable until you restart F-PC.  The word DEBUGABLE is called
        by the debugger, to switch the kernel to a debugable form, just
        as you start the debug process. On an XT class machine this may
        take as much as a second, but is only done once the first time
                you use the debugger.

          This utility works by patching each occurance of the unique
        sequence "26 AD FF E0" to JMP NEXT.

          You do not normally need to call this word, it is called
        automatically by the debugger.

  